CREATE TABLE meter (
	id           serial       PRIMARY KEY  NOT NULL,
	name         varchar(255)              NOT NULL,
	fortop_uid   varchar(50)               NOT NULL
);

DELETE FROM measurement;

ALTER TABLE measurement
	ADD meter_id integer                   NOT NULL;
