ALTER TABLE measurement
	DROP COLUMN p_gem_1,
	DROP COLUMN p_gem_2,
	DROP COLUMN p_gem_3,
	DROP COLUMN s_gem_1,
	DROP COLUMN s_gem_2,
	DROP COLUMN s_gem_3;
